SCURVE_MEAN: Threshold_Scan_with_HV.

Module "C60-24-03"

Column

0 10 20 30 40 50 60 70

Row

300

200

100

0

2200

2400

2600

2800

3000

3200

3400

3600

3800

4000

4200

4400

Threshold mod 2 chip 0

Constant 5142 Mean 3132 Sigma 46.55

2200 2400 2600 2800 3000 3200 3400 3600 3800 4000 4200 4400

1000

2000

3000

4000

5000

"Channel" = row+336*column+26880*chip

0 5000 10000 15000 20000 25000

2200

2400

2600

2800

3000

3200

3400

3600

3800

4000

4200

4400