IV-Measurement ON. Module "61-16-04"

HV (V)

-350 -300 -250 -200 -150 -100 -50 0

HV - current (A)

-1.4

-1.2

-1

-0.8

-0.6

-0.4

-0.2

0 -6 10× Graph