Channel

0 50 100 150 200 250 300 350 0

2000

4000

6000

8000

10000

Gain-Pream202.4-Shaper31.2 Nent = 386 Mean = 195.4 RMS = 112.7

ENC at 1.5 fC_{Gain-Pream202.4-Shaper31.2}