1000 1200 1400 1600 1800 2000 2200 2400 0

5

10

15

20

25 Constant = 22.03

Mean = 1635

Sigma = 83.21

ENC spread - chip 0

1000 1200 1400 1600 1800 2000 2200 2400 0

2

4

6

8

10

12

14

16

18

20

22

24 Constant = 22.92

Mean = 1616

Sigma = 77.81

ENC spread - chip 1

1000 1200 1400 1600 1800 2000 2200 2400 0

2

4

6

8

10

12

14

16

18

20 Constant = 17.67

Mean = 1625

Sigma = 94.2

ENC spread - chip 2