50% point (mV)

50 60 70 80 90 100 110 120 130 140 150 0

5

10

15

20

25

h100

Nent = 128

Mean = 83.62

RMS = 8.372

Chi2 / ndf = 36.08 / 25

Constant = 20.05 +- 2.679

Mean = 82.34 +- 0.2464

Sigma = 2.141 +- 0.1721

50% point spread - chip M0

50% point (mV)

50 60 70 80 90 100 110 120 130 140 150 0

2

4

6

8

10

12

14

16

18

h100

Nent = 128

Mean = 84.08

RMS = 7.771

Chi2 / ndf = 22.81 / 21

Constant = 15.09 +- 1.89

Mean = 83.68 +- 0.3766

Sigma = 3.585 +- 0.3213

50% point spread - chip S1

50% point (mV)

50 60 70 80 90 100 110 120 130 140 150 0

2

4

6

8

10

12

14

16

18

h100

Nent = 128

Mean = 82.67

RMS = 8.376

Chi2 / ndf = 29.17 / 22

Constant = 13.71 +- 2.381

Mean = 82.57 +- 0.381

Sigma = 3.527 +- 0.5058

50% point spread - chip S2