0 50 100 150 200 250 300 350 0

0.2

0.4

0.6

0.8

1 Channel-Pream190.0-Shaper17.2-360-2.0fC

Nent = 141

Mean = 58.53

RMS = 11.92

Channel-Pream190.0-Shaper17.2-360-2.0fC