Channel

0 50 100 150 200 250 300 350 0 500 1000

1500

2000

2500

3000

3500

4000

Gain-Pream190.0-Shaper17.2 Nent = 386 Mean = 196.4 RMS = 108.8

ENC at 2.00 fC, averge ENC: 2020_{Gain-Pream190.0-Shaper17.2}

Channel

0 50 100 150 200 250 300 350 0 20 40 60 80 100 120 140

Matching-Pream190.0-Shaper17.2-2.0fC Nent = 384 Mean = 192.2 RMS = 110.2

MEANS_{Matching-Pream190.0-Shaper17.2-2.0fC}