Strobe delay (DAC units)

0 10 20 30 40 50 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 Plateau = 0.7188 Mean0 = 4.725 Mean1 = 22.26 Sigma = 4.077

StobeDelay scan 1.25fC