0 5 10 15 20 25 30 35 40 0 5 10 15 20 25 30 35 walk Nent = 128 Mean = 19.95 RMS = 3.228 Constant = 30.46 Mean = 20.66 Sigma = 1.516

Time Walk Chip 0