0 5 10 15 20 25 30 35 40 0 5 10 15 20 25 30 35 walk Nent = 128 Mean = 20.41 RMS = 3.603 Constant = 32.99 Mean = 21.29 Sigma = 1.35

Time Walk Chip 1 walk